.eng-stor-head .offcanvas-icon.layout-2 .nav-menu-link{
	max-width:100%;
	padding:0;
}

body.elementor-template-full-width .elementor-full-wd{
	max-width: 100%;
	margin: 0;
	padding: 0;
}
.eng-stor-blog .title{
	border-top: 1px solid #f9f9f9;
	padding-top: 15px;
    margin-top: 14px;
}
.rt-bdr-30 .metform-btn,
.rt-bdr-30 .mf-form-wrapper .metform-form-content .metform-form-main-wrapper .mf-input-wrapper .mf-input{
	border-radius:30px !important;
}

.project-panel .air-condition-swiper-wrapper .swiper-wrapper .swiper-slide .single-case-ac .inner-content {
    left: 20px !important;
    width: auto;
    right: 20px;
}

@media only screen and (min-width: 1367px) and (max-width: 1800px){
body:not(.rtl) .eng-stor-head.elementor-widget__width-initial {
    right: 29px !important;
}
}