CLIENTFEEDBACK<h2>Our Latest Case Studies</h2>
		<!-- single case air condition start-->
			<a href="https://solari.themewant.com/rt-portfolios/water-flow-discharged/">
							<img width="483" height="501" src="https://solari.themewant.com/wp-content/uploads/2023/05/hydrow-power2-483x501.jpg" alt="" decoding="async" loading="lazy" />						</a>
										  Hydro Power
					<a href="https://solari.themewant.com/rt-portfolios/water-flow-discharged/">
											<h5> Water Flow Discharged</h5>
					</a>
		<!-- single case air condition end -->
		<!-- single case air condition start-->
			<a href="https://solari.themewant.com/rt-portfolios/light-energy-saving/">
							<img width="483" height="501" src="https://solari.themewant.com/wp-content/uploads/2023/05/energy-483x501.jpg" alt="" decoding="async" loading="lazy" />						</a>
										  Solar Energy
					<a href="https://solari.themewant.com/rt-portfolios/light-energy-saving/">
											<h5> Light Energy Saving</h5>
					</a>
		<!-- single case air condition end -->
		<!-- single case air condition start-->
			<a href="https://solari.themewant.com/rt-portfolios/man-worker-frild/">
							<img width="483" height="501" src="https://solari.themewant.com/wp-content/uploads/2023/05/man-worker-firld-by-solar-panels-483x501.jpg" alt="" decoding="async" loading="lazy" />						</a>
										  Solar Energy
					<a href="https://solari.themewant.com/rt-portfolios/man-worker-frild/">
											<h5> Man Worker Frild</h5>
					</a>
		<!-- single case air condition end -->
		<!-- single case air condition start-->
			<a href="https://solari.themewant.com/rt-portfolios/wearing-protection-equipment/">
							<img width="483" height="501" src="https://solari.themewant.com/wp-content/uploads/2023/05/medium-shot-engineer-wearing-protection-equipment-483x501.jpg" alt="" decoding="async" loading="lazy" />						</a>
										  Solar Energy
					<a href="https://solari.themewant.com/rt-portfolios/wearing-protection-equipment/">
											<h5> Wearing Protection Equipment</h5>
					</a>
		<!-- single case air condition end -->