<style>/*! elementor - v3.18.0 - 08-12-2023 */
.elementor-widget-image{text-align:center}.elementor-widget-image a{display:inline-block}.elementor-widget-image a img[src$=".svg"]{width:48px}.elementor-widget-image img{vertical-align:middle;display:inline-block}</style>												<img width="711" height="450" src="http://localhost/Medmac/wp-content/uploads/2024/03/tab2.jpg" alt="" srcset="http://localhost/Medmac/wp-content/uploads/2024/03/tab2.jpg 711w, https://solari.themewant.com/wp-content/uploads/2024/03/tab2-300x190.jpg 300w, https://solari.themewant.com/wp-content/uploads/2024/03/tab2-600x380.jpg 600w" sizes="(max-width: 711px) 100vw, 711px" />															
				<h2>Turbines Services</h2>
					<p>Over the past ten years, typical solar panel efficiencies have risen by 25% while installation costs have dropped significantly.</p>				
			<link rel="stylesheet" href="https://solari.themewant.com/wp-content/uploads/elementor/css/custom-widget-icon-list.min.css?ver=1710222175">		<ul>
							<li>
										Silfab Solar Panels 
									</li>
								<li>
										Qcells Solar Panels 
									</li>
						</ul>
					<ul>
							<li>
										Panasonic Solar Panels
									</li>
								<li>
										SunPower Solar Panels
									</li>
						</ul>