<p>[rev_slider alias="slider-1" slidertitle="Slider 1"][/rev_slider]<br /><img src="http://localhost/Medmac/wp-content/uploads/2023/07/19-1.png" alt="" /><br /><br /></p>
<h5>Eco Friendly</h5>
<p> </p>
<p>Litarrices sociosqu in commodo quam proin facilisis</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/07/26-1.png" alt="" /><br /><br /></p>
<h5>Easy Installation</h5>
<p> </p>
<p>Litarrices sociosqu in commodo quam proin facilisis</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/07/27-1.png" alt="" /><br /><br /></p>
<h5>Low Maintenance</h5>
<p> </p>
<p>Litarrices sociosqu in commodo quam proin facilisis</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/07/28-1.png" alt="" /><br /><br /></p>
<h5>Affordable Price</h5>
<p> </p>
<p>Litarrices sociosqu in commodo quam proin facilisis</p>
<p>ABOUTCOMPANY</p>
<h2>Our mission is to make solar energy accessible</h2>
<p>ABOUT US</p>
<p>we are passionate about transforming the way we power our world. As a leading provider of renewable energy solutions, we are committed to driving the transition to a cleaner, more sustainable future.</p>
<h3>14000+</h3>
<p>Installed Capacity</p>
<p> </p>
<h3>60%</h3>
<p>Save World</p>
<p><a><br />Learn More<br /></a></p>
<h3>Call Us 24/7</h3>
<p>+236-3256.21456</p>
<p><a href="https://www.youtube.com/watch?v=GasOvLJu2vQ"> </a></p>
<h3>80+</h3>
<p>Years Experience</p>
<p>OURSERVICES</p>
<h2>Produce Your Own Clean Save<br />The Environment</h2>
<p>OUR SERVICES<br /><img src="http://localhost/Medmac/wp-content/uploads/2023/07/20-2.png" alt="" /><br /><br /></p>
<h5>Solar Panel Services</h5>
<p> </p>
<p>Acinia phaselus tellus egstas into cursus urna suscpit vehicula otua pellentesque placerat</p>
<p><a href="#">Read More </a><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/07/29.png" alt="" /><br /><br /></p>
<h5>Turbines Services</h5>
<p> </p>
<p>Acinia phaselus tellus egstas into cursus urna suscpit vehicula otua pellentesque placerat</p>
<p><a href="#">Read More </a><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/07/20-2.png" alt="" /><br /><br /></p>
<h5>Hydropower Plants</h5>
<p> </p>
<p>Acinia phaselus tellus egstas into cursus urna suscpit vehicula otua pellentesque placerat</p>
<p><a href="#">Read More </a><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/07/29.png" alt="" /><br /><br /></p>
<h5>Fossil Resources</h5>
<p> </p>
<p>Acinia phaselus tellus egstas into cursus urna suscpit vehicula otua pellentesque placerat</p>
<p><a href="#">Read More </a><br />OURWORKING PROCESS</p>
<h2>Wind Solar Energy work<br />Project Planning</h2>
<p>WORK PROCESS<br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/01-5.png" alt="steps" /><br />01</p>
<h5>Project Planning</h5>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/02-3.png" alt="steps" /><br />02</p>
<h5>Research &amp; Analysis</h5>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/03-1.png" alt="steps" /><br />03</p>
<h5>Installation amp Maintenance</h5>
<p>FEEL FREETO CONTACT US</p>
<h2>Get Free Consultancy or<br />+1 (800) 123 446 559</h2>
<p><!----------------------------- 
			* controls_data : find the the props passed indie of data attribute
			* props.SubmitResponseMarkup : contains the markup of error or success message
			* https://developer.mozilla.org/en-US/docs/Web/JavaScript/Reference/Template_literals
		--------------------------- --><br />QUESTIONSFOR US</p>
<h2>Some General Question?</h2>
<p>FAQS<br /><button type="button" data-bs-toggle="collapse" data-bs-target="#collapse241951" aria-expanded="true" aria-controls="collapse241951"><br />What is solar energy, and how does it work?<br /></button></p>
<p>Solar energy is energy that is produced from the sun's light and heat. It is a renewable and clean source of energy that can be harnessed using solar panels.</p>
<p><button type="button" data-bs-toggle="collapse" data-bs-target="#collapse241952" aria-expanded="false" aria-controls="collapse241952"><br />Solar Equipment Maintenance:<br /></button></p>
<p>Solar energy is energy that is produced from the sun's light and heat. It is a renewable and clean source of energy that can be harnessed using solar panels.</p>
<p><button type="button" data-bs-toggle="collapse" data-bs-target="#collapse241953" aria-expanded="false" aria-controls="collapse241953"><br />Communication and Teamwork<br /></button></p>
<p>Solar energy is energy that is produced from the sun's light and heat. It is a renewable and clean source of energy that can be harnessed using solar panels.</p>
<p><button type="button" data-bs-toggle="collapse" data-bs-target="#collapse241954" aria-expanded="false" aria-controls="collapse241954"><br />Research and Development<br /></button></p>
<p>Solar energy is energy that is produced from the sun's light and heat. It is a renewable and clean source of energy that can be harnessed using solar panels.</p>
<p><button type="button" data-bs-toggle="collapse" data-bs-target="#collapse241955" aria-expanded="false" aria-controls="collapse241955"><br />Solar Design and Installation<br /></button></p>
<p>Solar energy is energy that is produced from the sun's light and heat. It is a renewable and clean source of energy that can be harnessed using solar panels.</p>
<p><style>/*! elementor - v3.18.0 - 04-12-2023 */<br />
.elementor-widget-image{text-align:center}.elementor-widget-image a{display:inline-block}.elementor-widget-image a img[src$=".svg"]{width:48px}.elementor-widget-image img{vertical-align:middle;display:inline-block}</style></p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/04-1.png" alt="" width="224" height="151" /><br /><a href="https://www.youtube.com/watch?v=GasOvLJu2vQ"><br /></a></p>
<p><style>/*! elementor - v3.18.0 - 04-12-2023 */<br />
.elementor-heading-title{padding:0;margin:0;line-height:1}.elementor-widget-heading .elementor-heading-title[class*=elementor-size-]>a{color:inherit;font-size:inherit;line-height:inherit}.elementor-widget-heading .elementor-heading-title.elementor-size-small{font-size:15px}.elementor-widget-heading .elementor-heading-title.elementor-size-medium{font-size:19px}.elementor-widget-heading .elementor-heading-title.elementor-size-large{font-size:29px}.elementor-widget-heading .elementor-heading-title.elementor-size-xl{font-size:39px}.elementor-widget-heading .elementor-heading-title.elementor-size-xxl{font-size:59px}</style></p>
<h2>Watch Our Intro</h2>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/Rectangle-254-1.png" sizes="(max-width: 524px) 100vw, 524px" srcset="http://localhost/Medmac/wp-content/uploads/2023/08/Rectangle-254-1.png 524w, https://solari.themewant.com/wp-content/uploads/2023/08/Rectangle-254-1-300x172.png 300w" alt="" width="524" height="301" /><br />CLIENTFEEDBACK</p>
<h2>Our Latest Case Studies</h2>
<p>LATEST CASE<br /><!-- single case air condition start--><br /><a href="https://solari.themewant.com/rt-portfolios/water-flow-discharged/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/hydrow-power2-483x501.jpg" alt="" width="483" height="501" /> </a><br />Hydro Power</p>
<h5>Water Flow Discharged</h5>
<p><br /><!-- single case air condition end --><br /><!-- single case air condition start--><br /><a href="https://solari.themewant.com/rt-portfolios/light-energy-saving/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/energy-483x501.jpg" alt="" width="483" height="501" /> </a><br />Solar Energy</p>
<h5>Light Energy Saving</h5>
<p><br /><!-- single case air condition end --><br /><!-- single case air condition start--><br /><a href="https://solari.themewant.com/rt-portfolios/man-worker-frild/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/man-worker-firld-by-solar-panels-483x501.jpg" alt="" width="483" height="501" /> </a><br />Solar Energy</p>
<h5>Man Worker Frild</h5>
<p><br /><!-- single case air condition end --><br /><!-- single case air condition start--><br /><a href="https://solari.themewant.com/rt-portfolios/wearing-protection-equipment/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/medium-shot-engineer-wearing-protection-equipment-483x501.jpg" alt="" width="483" height="501" /> </a><br />Solar Energy</p>
<h5>Wearing Protection Equipment</h5>
<p><br /><!-- single case air condition end --><br />CLIENTFEEDBACK</p>
<h2>Customer Feedbacks</h2>
<p>TESTIMONIALS<br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/09.png" sizes="(max-width: 264px) 100vw, 264px" srcset="http://localhost/Medmac/wp-content/uploads/2023/08/09.png 264w, https://solari.themewant.com/wp-content/uploads/2023/08/09-244x300.png 244w" alt="" width="264" height="324" /><br /><!-- single review area start --><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/07-1.png" alt="image" /></p>
<p>Fringilla sollicitudin luctus viverra egestas cras lacinia commodo sociosqu cubilia dictum difa tempus justo diam aliquet posuere lobortis afa placerat habitant vel auctor felis.</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/08.png" alt="image" /></p>
<h6>Faruk Ahmed</h6>
<p>Solar Manager<br /><!-- single review area end --><br /><!-- single review area start --><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/07-1.png" alt="image" /></p>
<p>Fringilla sollicitudin luctus viverra egestas cras lacinia commodo sociosqu cubilia dictum difa tempus justo diam aliquet posuere lobortis afa placerat habitant vel auctor felis.</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/08.png" alt="image" /></p>
<h6>Masud Rana</h6>
<p>Solar Manager<br /><!-- single review area end --><br /><!-- single review area start --><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/07-1.png" alt="image" /></p>
<p>Fringilla sollicitudin luctus viverra egestas cras lacinia commodo sociosqu cubilia dictum difa tempus justo diam aliquet posuere lobortis afa placerat habitant vel auctor felis.</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/08.png" alt="image" /></p>
<h6>Faruk Ahmed</h6>
<p>Solar Manager<br /><!-- single review area end --><br /><!-- single review area start --><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/07-1.png" alt="image" /></p>
<p>Fringilla sollicitudin luctus viverra egestas cras lacinia commodo sociosqu cubilia dictum difa tempus justo diam aliquet posuere lobortis afa placerat habitant vel auctor felis.</p>
<p><img src="http://localhost/Medmac/wp-content/uploads/2023/08/08.png" alt="image" /></p>
<h6>Masud Rana</h6>
<p>Solar Manager<br /><!-- single review area end --><br /><img src="http://localhost/Medmac/wp-content/uploads/2023/08/10.png" sizes="(max-width: 252px) 100vw, 252px" srcset="http://localhost/Medmac/wp-content/uploads/2023/08/10.png 252w, https://solari.themewant.com/wp-content/uploads/2023/08/10-238x300.png 238w" alt="" width="252" height="318" /><br />80+<br /><!-- 



<h2>80</h2>



 --></p>
<h2>80+</h2>
<p>Team Member</p>
<p>15KK<br /><!-- 



<h2>15K</h2>



 --></p>
<h2>15KK</h2>
<p>Work Have Done</p>
<p>93K<br /><!-- 



<h2>93</h2>



 --></p>
<h2>93K</h2>
<p>Happy Clients</p>
<p>18K<br /><!-- 



<h2>18</h2>



 --></p>
<h2>18K</h2>
<p>Awards Wining</p>
<p>OURBLOG</p>
<h2>Our Latest Blog</h2>
<p>WORK PROCESS<br /><!-- single blog area start --><br /><a href="https://solari.themewant.com/solar-radiance-illuminating-the-path-to-a-sustainable-future/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/blog-1-608x282.jpg" alt="" width="608" height="282" /> </a><br />May 2, 2023<br />ReacThemes<br />2 min</p>
<h5>Solar Radiance: Illuminating the Path to a Sustainable Future</h5>
<p><br /><a href="https://solari.themewant.com/solar-radiance-illuminating-the-path-to-a-sustainable-future/">Read More</a><br /><!-- single blog area end --><br /><a href="https://solari.themewant.com/solar-revolution-unleashing-clean-energy-from-the-sun/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/blog-2-232x232.jpg" sizes="(max-width: 232px) 100vw, 232px" srcset="https://solari.themewant.com/wp-content/uploads/2023/05/blog-2-232x232.jpg 232w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-2-150x150.jpg 150w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-2-87x87.jpg 87w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-2-300x300.jpg 300w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-2-100x100.jpg 100w" alt="" width="232" height="232" /> </a><br />May 2, 2023<br />ReacThemes</p>
<h5>Solar Revolution: Unleashing Clean Energy from the Sun</h5>
<p><br /><a href="https://solari.themewant.com/solar-revolution-unleashing-clean-energy-from-the-sun/">Read More</a><br /><a href="https://solari.themewant.com/generating-green-energy-the-hydroelectric-evolution/"><br /><img src="https://solari.themewant.com/wp-content/uploads/2023/05/blog-7-232x232.jpg" sizes="(max-width: 232px) 100vw, 232px" srcset="https://solari.themewant.com/wp-content/uploads/2023/05/blog-7-232x232.jpg 232w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-7-150x150.jpg 150w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-7-87x87.jpg 87w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-7-300x300.jpg 300w, https://solari.themewant.com/wp-content/uploads/2023/05/blog-7-100x100.jpg 100w" alt="" width="232" height="232" /> </a><br />May 1, 2023<br />ReacThemes</p>
<h5>Generating Green Energy: The Hydroelectric Evolution</h5>
<p><br /><a href="https://solari.themewant.com/generating-green-energy-the-hydroelectric-evolution/">Read More</a><br />FEEL FREETO CONTACT US</p>
<h2>Let’s Get in Touch</h2>
<p><!----------------------------- 
			* controls_data : find the the props passed indie of data attribute
			* props.SubmitResponseMarkup : contains the markup of error or success message
			* https://developer.mozilla.org/en-US/docs/Web/JavaScript/Reference/Template_literals
		--------------------------- --></p>
<p><style>/*! elementor - v3.18.0 - 04-12-2023 */<br />
.elementor-widget-google_maps .elementor-widget-container{overflow:hidden}.elementor-widget-google_maps .elementor-custom-embed{line-height:0}.elementor-widget-google_maps iframe{height:300px}</style></p>
<p><iframe title="reactheme" src="https://maps.google.com/maps?q=reactheme&amp;t=m&amp;z=10&amp;output=embed&amp;iwloc=near" aria-label="reactheme"></iframe><br /><a><img title="" src="http://localhost/Medmac/wp-content/uploads/2023/08/01-6.png" alt="" /></a><br /><a><img title="" src="http://localhost/Medmac/wp-content/uploads/2023/08/02-4.png" alt="" /></a><br /><a><img title="" src="http://localhost/Medmac/wp-content/uploads/2023/08/03-2.png" alt="" /></a><br /><a><img title="" src="http://localhost/Medmac/wp-content/uploads/2023/08/04-2.png" alt="" /></a><br /><a><img title="" src="http://localhost/Medmac/wp-content/uploads/2023/08/05-2.png" alt="" /></a></p>

<!-- wp:paragraph -->
<p></p>
<!-- /wp:paragraph -->